/*
Dreamer CMS 数据库备份工具 时间：2025-04-09
*/

DROP TABLE IF EXISTS `system_user_role`;

/*
Table structure for table `system_user_role`
*/
CREATE TABLE `system_user_role` (
  `id` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NOT NULL,
  `user_id` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL COMMENT '用户ID',
  `role_id` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL COMMENT '角色ID',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_bin;

/*
Data for table `system_user_role`
*/
INSERT INTO `system_user_role`(`id`, `role_id`, `user_id`) VALUES ('1645582974030209024', '08d8ce83eef944d88f0817187c308bfd', '1443c458e49c44539b63212cba8b9b1e');
INSERT INTO `system_user_role`(`id`, `role_id`, `user_id`) VALUES ('324968db08344f27b0b219d4908c2b08', '51c3cad610ce4dc4a279df50eec4d1ff', '9f4b807db2e94670bb02cdc212ea7389');
