/*
Dreamer CMS 数据库备份工具 时间：2025-04-09
*/

DROP TABLE IF EXISTS `system_cases`;

/*
Table structure for table `system_cases`
*/
CREATE TABLE `system_cases` (
  `id` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NOT NULL,
  `aid` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NOT NULL COMMENT '主表ID',
  `ext01` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  `ext02` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  `ext03` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  `ext04` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  `ext05` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  `body` mediumtext CHARACTER SET utf8mb4 COLLATE utf8mb4_bin,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_bin;

/*
Data for table `system_cases`
*/
INSERT INTO `system_cases`(`aid`, `body`, `ext01`, `ext02`, `ext03`, `ext04`, `ext05`, `id`) VALUES ('ced8d1640c87401ab0b2eaf0ab68757e', '<p><img src="/resources//uploads/20230109/1673256268085098771.png" title="1673256268085098771.png" alt="1673256268085098771.png" width="1920" height="1881" border="0" vspace="0" style="width: 1920px; height: 1881px;"/></p>', '', '', '', '', '', '3d40572d8bb24c4eb2bfef414f4a4cae');
INSERT INTO `system_cases`(`aid`, `body`, `ext01`, `ext02`, `ext03`, `ext04`, `ext05`, `id`) VALUES ('cca53a7338c042c0afa94f3183a652db', '<p><img src="/resources//uploads/20230109/1673257095752047342.jpg" title="1673257095752047342.jpg" alt="1.jpg"/></p><p><img src="/resources//uploads/20230109/1673257104865002732.jpg" title="1673257104865002732.jpg" alt="2.jpg"/></p><p><img src="/resources//uploads/20230109/1673257115970041534.png" title="1673257115970041534.png" alt="3.png"/></p>', '', '', '', '', '', 'b61babd4f83441c6a78e97097d7b4d42');
