/*
Dreamer CMS 数据库备份工具 时间：2025-04-09
*/

DROP TABLE IF EXISTS `system_adverts`;

/*
Table structure for table `system_adverts`
*/
CREATE TABLE `system_adverts` (
  `id` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NOT NULL,
  `aid` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NOT NULL COMMENT '主表ID',
  `ext01` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  `ext02` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  `ext03` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  `ext04` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  `ext05` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_bin;

/*
Data for table `system_adverts`
*/
INSERT INTO `system_adverts`(`aid`, `ext01`, `ext02`, `ext03`, `ext04`, `ext05`, `id`) VALUES ('42bf4ceb852e4a1cb641db209a211439', '', '', '', '', '', 'a878623c36284ab6b098420dae6573e3');
