/*
Dreamer CMS 数据库备份工具 时间：2025-04-09
*/

DROP TABLE IF EXISTS `system_images`;

/*
Table structure for table `system_images`
*/
CREATE TABLE `system_images` (
  `id` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NOT NULL,
  `aid` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NOT NULL COMMENT '主表ID',
  `ext01` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  `ext02` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  `ext03` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  `ext04` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  `ext05` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin DEFAULT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_bin;

/*
Data for table `system_images`
*/
INSERT INTO `system_images`(`aid`, `ext01`, `ext02`, `ext03`, `ext04`, `ext05`, `id`) VALUES ('498d51b3f1f643638dda51e5e7b7b792', '', '', '', '', '', '01a3114ad6d545929f0d9c254ae4597c');
INSERT INTO `system_images`(`aid`, `ext01`, `ext02`, `ext03`, `ext04`, `ext05`, `id`) VALUES ('1f7da4c6706c48ab8f9e223dbdfb80b4', '', '', '', '', '', '5d1bee097a1b41a4bc8622aebbc80775');
INSERT INTO `system_images`(`aid`, `ext01`, `ext02`, `ext03`, `ext04`, `ext05`, `id`) VALUES ('9eefb5b8aed845de99855f1d55d92a49', '', '', '', '', '', 'aa68151d0e444370bc35f85364d08304');
INSERT INTO `system_images`(`aid`, `ext01`, `ext02`, `ext03`, `ext04`, `ext05`, `id`) VALUES ('cc3c8a326842433292ad1bf7cae7e1c1', '', '', '', '', '', 'f689bb080c674b1384483ce015b6b81a');
INSERT INTO `system_images`(`aid`, `ext01`, `ext02`, `ext03`, `ext04`, `ext05`, `id`) VALUES ('ffa10f74ca384bc0aae3ab3e1c1beebc', '', '', '', '', '', 'fa0f63587d0646e8992ea1169fa11e30');
